-1 2 m

82.0

82.5

82.5

83.0

83.0

83.5

83.5

84.0

84.0

84.5

84.5

85.0

85.0

85.5

85.5

86.0

86.0 -75

-65

-65

-60 -55

-55

-50 -45

-45 -35 -25