-1 2 m

86.070

86.080 86.080

86.090 86.090

86.100 86.100

86.110 86.110

86.120 86.120

86.130 86.130

86.140 86.140

-69.4

-69.4

-69.2 -69.0

-69.0

-68.8 -68.6

-68.6