4U 1730-335

4U 1820-303

GRS 1758-258

GX 5-1

GRS 1747-312

GX 3+1

SLX 1744-299 SLX 1744-300

GX+02,-0.2

IGR J17464-3213

1E 1743.1-2843

1A 1742-294

Sgr A*

1E 1740.7-2942

SLX 1737-282 XTE J1739-285

SLX 1735-269

AX J1737.4-2907

GX 1+4

GX 354-0

4U 1722-30